\documentclass[a4paper]{article}
\usepackage[margin=1in]{geometry}
\usepackage{fancyhdr} % for headers
\usepackage[citestyle=verbose-ibid, backend=biber, autocite=footnote]{biblatex} % Footnote references. Use autocite{}.
\usepackage{lastpage} % For page X of Y

\bibliography{src/references}
\pagestyle{fancy}

% --- Configuration ---
\setlength{\parskip}{6pt}
\setlength{\parindent}{0pt}

\fancyfoot{}
\lhead{\rightmark}
\rhead{Page \thepage\ of \pageref{LastPage}}
\fancyheadoffset{0.005\textwidth}

\begin{document}
    \section{Abstract}
    \textit{Explains briefly the paper and what it aims to do.}

    \section{Introduction}
    \textit{Introduce the scope.}

    \section{Problem}
    \textit{Something about the MEOW monitor, and expanding it. Probably also why it would be a good idea(?)}

    \section{Background}
    \textit{Explaining the existing code and what it does and why.}

    \section{Method}
    \textit{Coding and shit}

    \section{Results}
    \textit{It works! (Hopefully. I haven't made it yet)}

    \section{Discussion}
    \textit{Why did I do that? What could I have done instead? Why would that have been way worse and stupid?}

    \section{Future Work}
    \textit{What should someone do if they want to fix my mistakes, or expand on them further.}

    \section{Conclusion}
    \textit{Something about being the best (but be humble about it).}

    \newpage
    \appendix
    \printbibliography{}
\end{document}